:_mod-docs-content-type: PROCEDURE
[id="updating-the-cluster-dashboard-configuration_{context}"]

= Updating the {CephCluster} cluster Ceph Dashboard configuration

[role="_abstract"]
If the Ceph Dashboard is part of the enabled Ceph Manager modules, you need to
reconfigure the failover settings.

.Procedure

. Regenerate the following {Ceph} configuration keys to point to the right
  `mgr` container:
+
----
mgr    advanced  mgr/dashboard/controller-0.ycokob/server_addr  172.17.3.33
mgr    advanced  mgr/dashboard/controller-1.lmzpuc/server_addr  172.17.3.147
mgr    advanced  mgr/dashboard/controller-2.xpdgfl/server_addr  172.17.3.138
----
+
----
$ sudo cephadm shell
$ ceph orch ps | awk '/mgr./ {print $1}'
----

. For each retrieved `mgr` daemon, update the corresponding entry in the {Ceph}
  configuration:
+
----
$ ceph config set mgr mgr/dashboard/<>/server_addr/<ip addr>
----
