:_mod-docs-content-type: PROCEDURE
[id="resolving-custom-image-pull-failures_{context}"]

= Resolving custom image pull failures

[role="_abstract"]
If Proteccio custom images fail to pull or start, verify image registry access, image pull secrets, and registry authentication.

Example error:

----
Failed to pull image "<Your Custom Pod Image and Tag>": rpc error
Pod has unbound immediate PersistentVolumeClaims
----

.Procedure

. Verify image registry access:
+
----
$ podman pull <custom_pod_image_and_tag>
----
+
where:

`<custom_pod_image_and_tag>`::
Specifies your custom pod image and the image tag.


. Check image pull secrets and registry authentication:
+
----
$ oc get secrets -n openstack | grep pull
$ oc describe pod <barbican_pod_name> -n openstack
----
+
where:

`<barbican_pod_name>`::
Specifies your Barbican pod name.

. Verify that the `OpenStackVersion` resource was applied correctly:
+
----
$ oc get openstackversion openstack -n openstack -o yaml
----
